---
title: "CLI logout command"
sidebarTitle: "Logout"
description: "Use these options when using the `logout` CLI command."
---

Run the command like this:

<CodeGroup>

```bash npm
npx trigger.dev@latest logout
```

```bash pnpm
pnpm dlx trigger.dev@latest logout
```

```bash yarn
yarn dlx trigger.dev@latest logout
```

</CodeGroup>

## Options

<ParamField body="Login profile" type="--profile">
  The login profile to use. Defaults to `default`.
</ParamField>

<ParamField body="API URL" type="--api-url | -a">
  Override the API URL. Defaults to `https://api.trigger.dev`.
</ParamField>

<ParamField body="Log level" type="--log-level | -l">
  The CLI log level to use. Options are `debug`, `info`, `log`, `warn`, `error`, and `none`. This
  does not affect the log level of your trigger.dev tasks. Defaults to `log`.
</ParamField>

<ParamField body="Skip telemetry" type="--skip-telemetry">
  Opt-out of sending telemetry data.
</ParamField>

## Standard options

<ParamField body="Help" type="--help | -h">
  Shows the help information for the command.
</ParamField>
